X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..4e4cea52b3fde0133dd3ab7049ec83996025799c:/docs/latex/wx/closeevt.tex

diff --git a/docs/latex/wx/closeevt.tex b/docs/latex/wx/closeevt.tex
index 9c90c4f5f3..cece933565 100644
--- a/docs/latex/wx/closeevt.tex
+++ b/docs/latex/wx/closeevt.tex
@@ -69,12 +69,6 @@ force the application to exit, and so this function must be called to check this
 
 Returns true if the user is logging off.
 
-\membersection{wxCloseEvent::GetSessionEnding}\label{wxcloseeventgetsessionending}
-
-\constfunc{bool}{GetSessionEnding}{\void}
-
-Returns true if the session is ending.
-
 \membersection{wxCloseEvent::GetForce}\label{wxcloseeventgetforce}
 
 \constfunc{bool}{GetForce}{\void}
