X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..3cc305b2b4a0674c56c84d7088cfd70676b850f0:/docs/latex/wx/strmbfrd.tex?ds=sidebyside

diff --git a/docs/latex/wx/strmbfrd.tex b/docs/latex/wx/strmbfrd.tex
index 3364df7543..7bf4920cdb 100644
--- a/docs/latex/wx/strmbfrd.tex
+++ b/docs/latex/wx/strmbfrd.tex
@@ -17,6 +17,10 @@ from (such as a file stream or a memory stream).
 
 <wx/stream.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxStreamBuffer}{wxstreambuffer}, \helpref{wxInputStream}{wxinputstream},
@@ -43,6 +47,10 @@ to (such as a file stream or a memory stream).
 
 <wx/stream.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxStreamBuffer}{wxstreambuffer}, \helpref{wxOutputStream}{wxoutputstream}
