X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..3cc305b2b4a0674c56c84d7088cfd70676b850f0:/docs/latex/wx/ddeclint.tex?ds=inline

diff --git a/docs/latex/wx/ddeclint.tex b/docs/latex/wx/ddeclint.tex
index bfb9f6eca2..4d1f26a7c3 100644
--- a/docs/latex/wx/ddeclint.tex
+++ b/docs/latex/wx/ddeclint.tex
@@ -23,6 +23,10 @@ wxClientBase\\
 
 <wx/dde.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxDDEServer}{wxddeserver}, \helpref{wxDDEConnection}{wxddeconnection}, 
@@ -66,6 +70,6 @@ store application-specific data in instances of the new class.
 
 \func{bool}{ValidHost}{\param{const wxString\& }{host}}
 
-Returns true if this is a valid host name, false otherwise. This always
-returns true under MS Windows.
+Returns \true if this is a valid host name, \false otherwise. This always
+returns \true under MS Windows.
 
