X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..13220cca727ed74c2998b4fb89a4d80aacf28e68:/docs/latex/wx/app.tex

diff --git a/docs/latex/wx/app.tex b/docs/latex/wx/app.tex
index ea9a161210..49a09ab262 100644
--- a/docs/latex/wx/app.tex
+++ b/docs/latex/wx/app.tex
@@ -209,7 +209,7 @@ to do it.
 
 \membersection{wxApp::IsMainLoopRunning}\label{wxappismainlooprunning}
 
-\constfunc{bool}{IsMainLoopRunning}{\void}
+\func{static bool}{IsMainLoopRunning}{\void}
 
 Returns \true if the main event loop is currently running, i.e. if the
 application is inside \helpref{OnRun}{wxapponrun}.
