X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f510b7b2f386afe6c3705c2cdbc9208435984dac..0bab4df569d6d43dc21e6c8a1fe684c7055e93e5:/docs/latex/wx/conditn.tex

diff --git a/docs/latex/wx/conditn.tex b/docs/latex/wx/conditn.tex
index c14e7e5f6f..ff0cfb3407 100644
--- a/docs/latex/wx/conditn.tex
+++ b/docs/latex/wx/conditn.tex
@@ -119,7 +119,7 @@ Default and only constructor. The {\it mutex} must be locked by the caller
 before calling \helpref{Wait}{wxconditionwait} function.
 
 Use \helpref{IsOk}{wxconditionisok} to check if the object was successfully
-intiialized.
+initialized.
 
 \membersection{wxCondition::\destruct{wxCondition}}\label{wxconditiondtor}
 
@@ -190,7 +190,7 @@ Returns {\tt wxCOND\_NO\_ERROR} on success, another value if an error occured.
 
 \membersection{wxCondition::WaitTimeout}\label{wxconditionwaittimeout}
 
-\func{wxCondError}{Wait}{\param{unsigned long}{ milliseconds}}
+\func{wxCondError}{WaitTimeout}{\param{unsigned long}{ milliseconds}}
 
 Waits until the condition is signalled or the timeout has elapsed.
 
@@ -205,6 +205,6 @@ timeout expires.
 \wxheading{Return value}
 
 Returns {\tt wxCOND\_NO\_ERROR} if the condition was signalled, 
-{\tt wxCOND\_TIMEOUT} if the timeout elapsed ebfore this happened or another
+{\tt wxCOND\_TIMEOUT} if the timeout elapsed before this happened or another
 error code from wxCondError enum.
 
