X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f4fcc2919776cffa5e3b2f0d44dd24c41e652ff4..dc92adaf0c8d1d8b71b4a4cabe6f42c3a17f62a1:/docs/latex/wx/panel.tex

diff --git a/docs/latex/wx/panel.tex b/docs/latex/wx/panel.tex
index 6dfeb8fe6e..1b8f49e5cb 100644
--- a/docs/latex/wx/panel.tex
+++ b/docs/latex/wx/panel.tex
@@ -29,8 +29,6 @@ See also \helpref{window styles overview}{windowstyles}.
 
 By default, a panel has the same colouring as a dialog.
 
-A panel may be loaded from a wxWindows resource file (extension {\tt wxr}).
-
 \wxheading{See also}
 
 \helpref{wxDialog}{wxdialog}
@@ -43,7 +41,7 @@ A panel may be loaded from a wxWindows resource file (extension {\tt wxr}).
 
 Default constructor.
 
-\func{}{wxPanel}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
+\func{}{wxPanel}{\param{wxWindow* }{parent}, \param{wxWindowID }{id = $-1$},\rtfsp
 \param{const wxPoint\& }{pos = wxDefaultPosition},\rtfsp
 \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
 \param{long}{ style = wxTAB\_TRAVERSAL},\rtfsp
@@ -58,10 +56,10 @@ Constructor.
 \docparam{id}{An identifier for the panel. A value of -1 is taken to mean a default.}
 
 \docparam{pos}{The panel position. A value of (-1, -1) indicates a default position, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{size}{The panel size. A value of (-1, -1) indicates a default size, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{style}{The window style. See \helpref{wxPanel}{wxpanel}.}
 
