X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f4fcc2919776cffa5e3b2f0d44dd24c41e652ff4..af49404386397a3582cdb0070aab315bd5d83d91:/docs/latex/wx/activevt.tex

diff --git a/docs/latex/wx/activevt.tex b/docs/latex/wx/activevt.tex
index 5d9c5ff4dc..5f2794ad29 100644
--- a/docs/latex/wx/activevt.tex
+++ b/docs/latex/wx/activevt.tex
@@ -43,7 +43,7 @@ or a frame becomes inactivate resulting in all application frames being inactive
 
 \membersection{wxActivateEvent::wxActivateEvent}
 
-\func{}{wxActivateEvent}{\param{WXTYPE }{eventType = 0}, \param{bool}{ active = TRUE}, \param{int }{id = 0}}
+\func{}{wxActivateEvent}{\param{WXTYPE }{eventType = 0}, \param{bool}{ active = true}, \param{int }{id = 0}}
 
 Constructor.
 
@@ -51,11 +51,11 @@ Constructor.
 
 \member{bool}{m\_active}
 
-TRUE if the window or application was activated.
+true if the window or application was activated.
 
 \membersection{wxActivateEvent::GetActive}\label{wxactivateeventgetactive}
 
 \constfunc{bool}{GetActive}{\void}
 
-Returns TRUE if the application or window is being activated, FALSE otherwise.
+Returns true if the application or window is being activated, false otherwise.
 
