X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f4fcc2919776cffa5e3b2f0d44dd24c41e652ff4..69a126b0c72e4318adb5b1d526f1082d368c7509:/docs/latex/wx/scrolbar.tex

diff --git a/docs/latex/wx/scrolbar.tex b/docs/latex/wx/scrolbar.tex
index f1c745a7e6..955134b7bc 100644
--- a/docs/latex/wx/scrolbar.tex
+++ b/docs/latex/wx/scrolbar.tex
@@ -49,22 +49,7 @@ to the size of the window and the size of the data.
 
 See also \helpref{window styles overview}{windowstyles}.
 
-\wxheading{Event handling}
-
-To process input from a scrollbar, use one of these event handler macros to direct input to member
-functions that take a \helpref{wxScrollEvent}{wxscrollevent} argument:
-
-\twocolwidtha{7cm}
-\begin{twocollist}
-\twocolitem{{\bf EVT\_COMMAND\_SCROLL(id, func)}}{Catch all scroll commands.}
-\twocolitem{{\bf EVT\_COMMAND\_SCROLL\_TOP(id, func)}}{Catch a command to put the scroll thumb at the maximum position.}
-\twocolitem{{\bf EVT\_COMMAND\_SCROLL\_BOTTOM(id, func)}}{Catch a command to put the scroll thumb at the maximum position.}
-\twocolitem{{\bf EVT\_COMMAND\_SCROLL\_LINEUP(id, func)}}{Catch a line up command.}
-\twocolitem{{\bf EVT\_COMMAND\_SCROLL\_LINEDOWN(id, func)}}{Catch a line down command.}
-\twocolitem{{\bf EVT\_COMMAND\_SCROLL\_PAGEUP(id, func)}}{Catch a page up command.}
-\twocolitem{{\bf EVT\_COMMAND\_SCROLL\_PAGEDOWN(id, func)}}{Catch a page down command.}
-\twocolitem{{\bf EVT\_COMMAND\_SCROLL\_THUMBTRACK(id, func)}}{Catch a thumbtrack command (continuous movement of the scroll thumb).}
-\end{twocollist}%
+\input scrolevt.inc
 
 \wxheading{See also}
 
@@ -230,7 +215,7 @@ Sets the position of the scrollbar.
 \func{virtual void}{SetScrollbar}{\param{int }{position},\rtfsp
 \param{int }{thumbSize}, \param{int }{range},\rtfsp
 \param{int }{pageSize},\rtfsp
-\param{const bool }{refresh = TRUE}}
+\param{const bool }{refresh = true}}
 
 Sets the scrollbar properties.
 
@@ -246,7 +231,7 @@ Sets the scrollbar properties.
 the scrollbar will scroll when it is paged up or down. Often it is the same as
 the thumb size.}
 
-\docparam{refresh}{TRUE to redraw the scrollbar, FALSE otherwise.}
+\docparam{refresh}{true to redraw the scrollbar, false otherwise.}
 
 \wxheading{Remarks}
 
