X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f4f5d5697dc5e34a5582061dbd857d1cd4326f91..13b555259270512e01b20631c60468327fd08ba7:/docs/latex/wx/function.tex

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index 60bc6be9e6..85907e6194 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -20,7 +20,6 @@ the corresponding topic.
 \section{Alphabetical functions and macros list}\label{functionsalphabetically}
 
 \helpref{CLASSINFO}{classinfo}\\
-\helpref{copystring}{copystring}\\
 \helpref{DECLARE\_ABSTRACT\_CLASS}{declareabstractclass}\\
 \helpref{DECLARE\_APP}{declareapp}\\
 \helpref{DECLARE\_CLASS}{declareclass}\\
@@ -351,7 +350,7 @@ Same as \helpref{wxCHECK\_VERSION}{wxcheckversion} but also checks that
 
 \membersection{wxCHECK\_W32API\_VERSION}\label{wxcheckw32apiversion}
 
-\func{bool}{wxCHECK\_GCC\_VERSION}{\param{}{major, minor, release}}
+\func{bool}{wxCHECK\_W32API\_VERSION}{\param{}{major, minor, release}}
 
 Returns $1$ if the version of w32api headers used is major.minor.release or
 greater. Otherwise, and also if we are not compiling with mingw32/cygwin under
@@ -1614,17 +1613,6 @@ if successful, \false otherwise.
 
 \section{String functions}\label{stringfunctions}
 
-
-\membersection{::copystring}\label{copystring}
-
-\func{char *}{copystring}{\param{const char *}{s}}
-
-Makes a copy of the string {\it s} using the C++ new operator, so it can be
-deleted with the {\it delete} operator.
-
-This function is deprecated, use \helpref{wxString}{wxstring} class instead.
-
-
 \membersection{::wxGetTranslation}\label{wxgettranslation}
 
 \func{const wxString\& }{wxGetTranslation}{\param{const wxString\& }{str},
@@ -4287,29 +4275,8 @@ this value.
 
 \section{Time functions}\label{timefunctions}
 
-The functions in this section deal with getting the current time and
-starting/stopping the global timers. Please note that the timer functions are
-deprecated because they work with one global timer only and
-\helpref{wxTimer}{wxtimer} and/or \helpref{wxStopWatch}{wxstopwatch} classes
-should be used instead. For retrieving the current time, you may also use
-\helpref{wxDateTime::Now}{wxdatetimenow} or
-\helpref{wxDateTime::UNow}{wxdatetimeunow} methods.
-
-
-\membersection{::wxGetElapsedTime}\label{wxgetelapsedtime}
-
-\func{long}{wxGetElapsedTime}{\param{bool}{ resetTimer = true}}
-
-Gets the time in milliseconds since the last \helpref{::wxStartTimer}{wxstarttimer}.
-
-If {\it resetTimer} is true (the default), the timer is reset to zero
-by this call.
-
-See also \helpref{wxTimer}{wxtimer}.
-
-\wxheading{Include files}
-
-<wx/timer.h>
+The functions in this section deal with getting the current time and sleeping
+for the specified time interval.
 
 
 \membersection{::wxGetLocalTime}\label{wxgetlocaltime}
@@ -4324,7 +4291,7 @@ Returns the number of seconds since local time 00:00:00 Jan 1st 1970.
 
 \wxheading{Include files}
 
-<wx/timer.h>
+<wx/stopwatch.h>
 
 
 \membersection{::wxGetLocalTimeMillis}\label{wxgetlocaltimemillis}
@@ -4340,7 +4307,7 @@ Returns the number of milliseconds since local time 00:00:00 Jan 1st 1970.
 
 \wxheading{Include files}
 
-<wx/timer.h>
+<wx/stopwatch.h>
 
 
 \membersection{::wxGetUTCTime}\label{wxgetutctime}
@@ -4355,7 +4322,7 @@ Returns the number of seconds since GMT 00:00:00 Jan 1st 1970.
 
 \wxheading{Include files}
 
-<wx/timer.h>
+<wx/stopwatch.h>
 
 
 \membersection{::wxMicroSleep}\label{wxmicrosleep}
@@ -4407,19 +4374,6 @@ Sleeps for the specified number of seconds.
 <wx/utils.h>
 
 
-\membersection{::wxStartTimer}\label{wxstarttimer}
-
-\func{void}{wxStartTimer}{\void}
-
-Starts a stopwatch; use \helpref{::wxGetElapsedTime}{wxgetelapsedtime} to get the elapsed time.
-
-See also \helpref{wxTimer}{wxtimer}.
-
-\wxheading{Include files}
-
-<wx/timer.h>
-
-
 \membersection{::wxUsleep}\label{wxusleep}
 
 \func{void}{wxUsleep}{\param{unsigned long}{ milliseconds}}
