X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f4f5d5697dc5e34a5582061dbd857d1cd4326f91..0bd2681966523df88ad5cf8e505b532843e58d74:/docs/latex/wx/image.tex

diff --git a/docs/latex/wx/image.tex b/docs/latex/wx/image.tex
index 7113961532..56a42b74d9 100644
--- a/docs/latex/wx/image.tex
+++ b/docs/latex/wx/image.tex
@@ -36,10 +36,12 @@ means that the pixel is 100\% opaque.
 
 Unlike RGB data, not all images have an alpha channel and before using
 \helpref{GetAlpha}{wximagegetalpha} you should check if this image contains
-an alpha channel with \helpref{HasAlpha}{wximagehasalpha}. Note that currently only
-images loaded from PNG files with transparency information will have an alpha
-channel but alpha support will be added to the other formats as well (as well
-as support for saving images with alpha channel which also isn't implemented).
+an alpha channel with \helpref{HasAlpha}{wximagehasalpha}. Note that currently
+only the PNG format has full alpha channel support so only the images loaded
+from PNG files can have alpha and, if you initialize the image alpha channel
+yourself using \helpref{SetAlpha}{wximagesetalpha}, you should save it in PNG
+format to avoid losing it.
+
 
 \wxheading{Available image handlers}
 
@@ -80,6 +82,10 @@ PNM format, {\bf wxPNMHandler} will always save as raw RGB.
 
 <wx/image.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxBitmap}{wxbitmap},
@@ -1326,6 +1332,10 @@ created by IJG.)
 
 <wx/image.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxImage}{wximage},
