X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f4c43a177e90b0699097934d4bc40b3fc452becd..fbb2b01c2cef520bd91af451d8d18e4219b0a0c6:/docs/latex/wx/rect.tex

diff --git a/docs/latex/wx/rect.tex b/docs/latex/wx/rect.tex
index f99446bc73..b011d5a08e 100644
--- a/docs/latex/wx/rect.tex
+++ b/docs/latex/wx/rect.tex
@@ -149,7 +149,7 @@ Gets the y member.
 
 Increase the rectangle size by {\it dx} in x direction and {\it dy} in y
 direction. Both (or one of) parameters may be negative to decrease the
-rectngle size.
+rectangle size.
 
 The second form uses the same {\it diff} for both {\it dx} and {\it dy}.
 
