X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f491be1060adde6a896e65de4270ca69494f7a21..81c882b613b5d99ddb1e5ab69fcd7ebccc287025:/docs/latex/wx/tlw.tex

diff --git a/docs/latex/wx/tlw.tex b/docs/latex/wx/tlw.tex
index f59290a24f..5c949d8c1b 100644
--- a/docs/latex/wx/tlw.tex
+++ b/docs/latex/wx/tlw.tex
@@ -40,6 +40,18 @@ Returns \true if the platform supports making the window translucent.
 \helpref{wxTopLevelWindow::SetTransparent}{wxtoplevelwindowsettransparent}
 
 
+\membersection{wxTopLevelWindow::EnableCloseButton}\label{wxtoplevelenableclosebutton}
+
+\func{bool}{EnableCloseButton}{\param{bool}{ enable = true}}
+
+Enables or disables the Close button (most often in the right
+upper corner of a dialog) and the Close entry of the system
+menu (most often in the left upper corner of the dialog).
+Currently only implemented for wxMSW and wxGTK. Returns
+true if operation was successful. This may be wrong on
+X11 (including GTK+) where the window manager may not support
+this operation and there is no way to find out.
+
 \membersection{wxTopLevelWindow::GetDefaultItem}\label{wxtoplevelwindowgetdefaultitem}
 
 \constfunc{wxWindow *}{GetDefaultItem}{\void}
@@ -268,6 +280,43 @@ Unavailable on full keyboard machines.
 \helpref{wxTopLevelWindow::SetRightMenu}{wxtoplevelwindowsetrightmenu}.
 
 
+\membersection{wxTopLevelWindow::SetMaxSize}\label{wxtoplevelwindowsetmaxsize}
+
+\func{void}{SetMaxSize}{\param{const wxSize\& }{size}}
+
+A simpler interface for setting the size hints than
+\helpref{SetSizeHints}{wxtoplevelwindowsetsizehints}.
+
+\membersection{wxTopLevelWindow::SetMinSize}\label{wxtoplevelwindowsetminsize}
+
+\func{void}{SetMinSize}{\param{const wxSize\& }{size}}
+
+A simpler interface for setting the size hints than
+\helpref{SetSizeHints}{wxtoplevelwindowsetsizehints}.
+
+\membersection{wxTopLevelWindow::SetSizeHints}\label{wxtoplevelwindowsetsizehints}
+
+\func{virtual void}{SetSizeHints}{\param{int}{ minW}, \param{int}{ minH}, \param{int}{ maxW=-1}, \param{int}{ maxH=-1},
+ \param{int}{ incW=-1}, \param{int}{ incH=-1}}
+
+\func{void}{SetSizeHints}{\param{const wxSize\&}{ minSize},
+\param{const wxSize\&}{ maxSize=wxDefaultSize}, \param{const wxSize\&}{ incSize=wxDefaultSize}}
+
+Allows specification of minimum and maximum window sizes, and window size increments.
+If a pair of values is not set (or set to -1), the default values will be used.
+
+\docparam{incW}{Specifies the increment for sizing the width (GTK/Motif/Xt only).}
+
+\docparam{incH}{Specifies the increment for sizing the height (GTK/Motif/Xt only).}
+
+\docparam{incSize}{Increment size (GTK/Motif/Xt only).}
+
+\wxheading{Remarks}
+
+If this function is called, the user will not be able to size the window outside
+the given bounds. The resizing increments are only significant under GTK, Motif or Xt.
+
+
 \membersection{wxTopLevelWindow::SetRightMenu}\label{wxtoplevelwindowsetrightmenu}
 
 \func{void}{SetRightMenu}{\param{int}{ id = wxID\_ANY}, \param{const wxString\&}{ label = wxEmptyString}, \param{wxMenu *}{ subMenu = NULL}}
@@ -412,3 +461,4 @@ for some reason.
 \wxheading{See also}
 
 \helpref{UseNativeDecorations}{wxtoplevelwindowusenativedecorations}
+
