X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f4647740bb001b5855b29ce7ff179a6c8cff1640..302511a3ca8d831ee26c7dfc47c928e8fed8fef6:/docs/latex/wx/dataviewmodel.tex

diff --git a/docs/latex/wx/dataviewmodel.tex b/docs/latex/wx/dataviewmodel.tex
index 7279f240e8..c14c20776c 100644
--- a/docs/latex/wx/dataviewmodel.tex
+++ b/docs/latex/wx/dataviewmodel.tex
@@ -124,7 +124,8 @@ to the model.
 
 \func{virtual bool}{Cleared}{\void}
 
-Called to inform the model that all data has been deleted.
+Called to inform the model that all data has been cleared. The
+control will reread the data from the model again.
 
 
 \membersection{wxDataViewModel::Compare}\label{wxdataviewmodelcompare}
