X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f439844be27aa4ec09dd1d3365ce44653291c2af..e8800dcfa76ba8ff79c2d171dc5d45028dca4574:/docs/latex/wx/strmmem.tex?ds=sidebyside

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index 523b4977fb..920ad7b36e 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -13,7 +13,7 @@
 
 \wxheading{See also}
 
-\helpref{wxStreamBuffer}{wxstreamBuffer}
+\helpref{wxStreamBuffer}{wxstreambuffer}, \helpref{wxMemoryOutputStream}{wxmemoutputstream}
 
 % ----------
 % Members
@@ -25,11 +25,12 @@
 \func{}{wxMemoryInputStream}{\param{const char *}{ data}, \param{size\_t}{ len}}
 
 Initializes a new read-only memory stream which will use the specified buffer
-\it{data} of length \it{len}.
+{\it data} of length {\it len}. The stream does not take ownership of the 
+buffer, i.e. that it will not delete in its destructor.
 
 \membersection{wxMemoryInputStream::\destruct{wxMemoryInputStream}}
 
-\func{}{\destruct{wxFileInputStream}}{\void}
+\func{}{\destruct{wxMemoryInputStream}}{\void}
 
 Destructor.
 
@@ -48,7 +49,7 @@ Destructor.
 
 \wxheading{See also}
 
-\helpref{wxStreamBuffer}{wxstreamBuffer}
+\helpref{wxStreamBuffer}{wxstreambuffer}
 
 % ----------
 % Members
@@ -59,8 +60,8 @@ Destructor.
 
 \func{}{wxMemoryOutputStream}{\param{char *}{ data = NULL}, \param{size\_t}{ length = 0}}
 
-If \it{data} is NULL, then it will initialize a new empty buffer which will
-grow when it needs.
+If {\it data} is NULL, then it will initialize a new empty buffer which will
+grow if required.
 
 \wxheading{Warning}
 
@@ -78,10 +79,11 @@ Destructor.
 \constfunc{size\_t}{CopyTo}{\param{char *}{buffer}, \param{size\_t }{len}}
 
 CopyTo allowed you to transfer data from the internal buffer of
-wxMemoryOutputStream to an external buffer. \it{len} specifies the size of
+wxMemoryOutputStream to an external buffer. {\it len} specifies the size of
 the buffer.
 
 \wxheading{Returned value}
 
 CopyTo returns the number of bytes copied to the buffer. Generally it is either
 len or the size of the stream buffer.
+
