X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f439844be27aa4ec09dd1d3365ce44653291c2af..bffa1c774644a26baf71d05cb51068ac2ffc6908:/docs/latex/wx/strmmem.tex

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index 523b4977fb..3892bf665d 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -85,3 +85,4 @@ the buffer.
 
 CopyTo returns the number of bytes copied to the buffer. Generally it is either
 len or the size of the stream buffer.
+
