X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f415cab9ef1433413a1a68a982ee9b17c5a8deda..c699b4583b6047191ac326728654c6fe8920aa7b:/docs/latex/wx/pagedlg.tex

diff --git a/docs/latex/wx/pagedlg.tex b/docs/latex/wx/pagedlg.tex
index b7d9cbafff..961f58da45 100644
--- a/docs/latex/wx/pagedlg.tex
+++ b/docs/latex/wx/pagedlg.tex
@@ -25,6 +25,7 @@ by the application.
 \wxheading{Derived from}
 
 \helpref{wxDialog}{wxdialog}\\
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
@@ -33,6 +34,10 @@ by the application.
 
 <wx/printdlg.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{Printing framework overview}{printingoverview}, 
@@ -90,6 +95,10 @@ user-interface configuration settings stored by wxPageSetupDialogData).
 
 <wx/cmndata.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{Printing framework overview}{printingoverview}, 
