X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f415cab9ef1433413a1a68a982ee9b17c5a8deda..65dd9ae23c1532fbbd43c19dccd7cc8a25a8a6f4:/docs/latex/wx/print.tex

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index 3ef48559b7..b3a562a06d 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -14,6 +14,10 @@ between the print dialogs and the application.
 
 <wx/cmndata.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{Printing framework overview}{printingoverview}, 
@@ -362,6 +366,7 @@ a successfully dismissed print dialog.
 \wxheading{Derived from}
 
 \helpref{wxDialog}{wxdialog}\\
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
@@ -370,6 +375,10 @@ a successfully dismissed print dialog.
 
 <wx/printdlg.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{Printing framework overview}{printingoverview}, 
@@ -436,6 +445,10 @@ It contains a wxPrintData object with underlying printing settings.
 
 <wx/cmndata.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{Printing framework overview}{printingoverview}, 
@@ -796,6 +809,10 @@ advice on achieving the correct scaling for the page.
 
 <wx/dcprint.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{Printing framework overview}{printingoverview}, 
