X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f3d6a60294f119d6f6e7f1eae68301dcbb3dd6ed..5db9e0e80de7e0ddec39309ce7788e38610c8f40:/docs/latex/wx/htcell.tex

diff --git a/docs/latex/wx/htcell.tex b/docs/latex/wx/htcell.tex
index fc54ec8317..6733cfabc5 100644
--- a/docs/latex/wx/htcell.tex
+++ b/docs/latex/wx/htcell.tex
@@ -237,7 +237,7 @@ Sets unique cell identifier. Default value is no identifier, i.e. empty string.
 
 \func{void}{SetLink}{\param{const wxHtmlLinkInfo\& }{link}}
 
-Sets the hypertext link asocciated with this cell. (Default value
+Sets the hypertext link associated with this cell. (Default value
 is \helpref{wxHtmlLinkInfo}{wxhtmllinkinfo}("", "") (no link))
 
 \membersection{wxHtmlCell::SetNext}\label{wxhtmlcellsetnext}
