X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f38d3607bb57783c968caa357b0a194fa4676d34..e0976f6db35b304f16519437c9d9e2450a373783:/docs/latex/wx/button.tex

diff --git a/docs/latex/wx/button.tex b/docs/latex/wx/button.tex
index afd59c4731..affe8c5eb7 100644
--- a/docs/latex/wx/button.tex
+++ b/docs/latex/wx/button.tex
@@ -16,6 +16,10 @@ almost any other window.
 
 <wx/button.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}%
@@ -25,7 +29,7 @@ almost any other window.
 \twocolitem{\windowstyle{wxBU\_RIGHT}}{Right-justifies the bitmap label. Windows and GTK+ only.}
 \twocolitem{\windowstyle{wxBU\_BOTTOM}}{Aligns the label to the bottom of the button. Windows and GTK+ only.}
 \twocolitem{\windowstyle{wxBU\_EXACTFIT}}{Creates the button as small as possible instead of making it of the standard size (which is the default behaviour ).}
-\twocolitem{\windowstyle{wxNO\_BORDER}}{Creates a flat button. Windows and GTK+ only.}
+\twocolitem{\windowstyle{wxBORDER\_NONE}}{Creates a flat button. Windows and GTK+ only.}
 \end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
@@ -134,7 +138,7 @@ Under Windows, only dialog box buttons respond to this function.  As
 normal under Windows and Motif, pressing return causes the default button to
 be depressed when the return key is pressed. See also \helpref{wxWindow::SetFocus}{wxwindowsetfocus}\rtfsp
 which sets the keyboard focus for windows and text panel items,\rtfsp
-and \helpref{wxPanel::SetDefaultItem}{wxpanelsetdefaultitem}.
+and \helpref{wxTopLevelWindow::SetDefaultItem}{wxtoplevelwindowsetdefaultitem}.
 
 Note that under Motif, calling this function immediately after
 creation of a button and before the creation of other buttons
