X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f3845e889c7ccfe03d034a0aa79b4f4d19fbcb06..d86939c4c948c98d9f840e728c8c1ae2a99e1e4f:/docs/latex/wx/pagedlg.tex

diff --git a/docs/latex/wx/pagedlg.tex b/docs/latex/wx/pagedlg.tex
index ab02ba67b2..b68a9ffeb6 100644
--- a/docs/latex/wx/pagedlg.tex
+++ b/docs/latex/wx/pagedlg.tex
@@ -50,6 +50,14 @@ Destructor.
 
 Returns the \helpref{page setup data}{wxpagesetupdialogdata} associated with the dialog.
 
+\membersection{wxPageSetupDialog::Ok}\label{wxpagesetupdialogok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns TRUE if the print data associated with the dialog data is valid.
+This can return FALSE on Windows if the current printer is not set, for example.
+On all other platforms, it returns TRUE.
+
 \membersection{wxPageSetupDialog::ShowModal}\label{wxpagesetupdialogshowmodal}
 
 \func{int}{ShowModal}{\void}
@@ -218,6 +226,14 @@ Returns the paper size in millimetres.
 
 Returns a reference to the \helpref{print data}{wxprintdata} associated with this object.
 
+\membersection{wxPageSetupDialogData::Ok}\label{wxpagesetupdialogdataok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns TRUE if the print data associated with the dialog data is valid.
+This can return FALSE on Windows if the current printer is not set, for example.
+On all other platforms, it returns TRUE.
+
 \membersection{wxPageSetupDialogData::SetDefaultInfo}\label{wxpagesetupdialogdatasetdefaultinfo}
 
 \func{void}{SetDefaultInfo}{\param{bool}{ flag}}
