X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f3845e889c7ccfe03d034a0aa79b4f4d19fbcb06..cdfb1ae1bcacb8327589a09e6a67f8fc1ef5a82e:/docs/latex/wx/log.tex

diff --git a/docs/latex/wx/log.tex b/docs/latex/wx/log.tex
index 6cf3d92813..67038849f5 100644
--- a/docs/latex/wx/log.tex
+++ b/docs/latex/wx/log.tex
@@ -136,7 +136,7 @@ documentation.
 
 Finally, the {\it wxLog::DoLog()} function automatically prepends a time stamp
 to all the messages. The format of the time stamp may be changed: it can be
-any string with \% specificators fully described in the documentation of the
+any string with \% specifications fully described in the documentation of the
 standard {\it strftime()} function. For example, the default format is
 "[\%d/\%b/\%y \%H:\%M:\%S] " which gives something like "[17/Sep/98 22:10:16] "
 (without quotes) for the current date. Setting an empty string as the time
@@ -292,7 +292,7 @@ user). (Almost) for internal use only.
 
 \func{static void}{SetVerbose}{\param{bool }{ verbose = TRUE}}
 
-Activates or desactivates verbose mode in which the verbose messages are
+Activates or deactivates verbose mode in which the verbose messages are
 logged as the normal ones instead of being silently dropped.
 
 \membersection{wxLog::GetVerbose}\label{wxloggetverbose}
