X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f3845e889c7ccfe03d034a0aa79b4f4d19fbcb06..6f63704ff4db9da6976547a1378d7e85b966eea7:/docs/latex/wx/dllload.tex

diff --git a/docs/latex/wx/dllload.tex b/docs/latex/wx/dllload.tex
index cacac58090..4c54aae8e6 100644
--- a/docs/latex/wx/dllload.tex
+++ b/docs/latex/wx/dllload.tex
@@ -74,7 +74,7 @@ No base class
 
 \wxheading{Data structures}
 
-This header defines a platfrom-dependent {\tt wxDllType} typedef which stores
+This header defines a platform-dependent {\tt wxDllType} typedef which stores
 a handle to a loaded DLLs on the given platform.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
@@ -123,8 +123,8 @@ an error occured.
 
 This function loads a shared library into memory, with {\it libname} being the
 name of the library: it may be either the full name including path and
-(platform-dependent) extenesion, just the basename (no path and no extension)
-or a basename with extentsion. In the last two cases, the library will be
+(platform-dependent) extension, just the basename (no path and no extension)
+or a basename with extension. In the last two cases, the library will be
 searched in all standard locations.
 
 Returns a handle to the loaded DLL. Use {\it success} parameter to test if it
@@ -135,8 +135,8 @@ is valid. If the handle is valid, the library must be unloaded later with
 
 \docparam{libname}{Name of the shared object to load.}
 
-\docparam{success}{May point to a bool variable which will be set to TRUE or
-FALSE; may also be {\tt NULL}.}
+\docparam{success}{May point to a bool variable which will be set to true or
+false; may also be {\tt NULL}.}
 
 \membersection{wxDllLoader::UnloadLibrary}\label{wxdllloaderunloadlibrary}
 
