X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f3845e889c7ccfe03d034a0aa79b4f4d19fbcb06..0b40f3d80b78cfbcce1927a684239bfe8d37fe58:/docs/latex/wx/pagedlg.tex

diff --git a/docs/latex/wx/pagedlg.tex b/docs/latex/wx/pagedlg.tex
index ab02ba67b2..8ca71e6c91 100644
--- a/docs/latex/wx/pagedlg.tex
+++ b/docs/latex/wx/pagedlg.tex
@@ -1,7 +1,7 @@
 \section{\class{wxPageSetupDialog}}\label{wxpagesetupdialog}
 
 This class represents the page setup common dialog. The page setup dialog is standard from
-Windows 95 on, replacing the print setup dialog (which is retained in Windows and wxWindows
+Windows 95 on, replacing the print setup dialog (which is retained in Windows and wxWidgets
 for backward compatibility). On Windows 95 and NT 4.0 and above, the page setup dialog is
 native to the windowing system, otherwise it is emulated.
 
@@ -31,14 +31,14 @@ application.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPageSetupDialog::wxPageSetupDialog}
+\membersection{wxPageSetupDialog::wxPageSetupDialog}\label{wxpagesetupdialogctor}
 
 \func{}{wxPageSetupDialog}{\param{wxWindow* }{parent}, \param{wxPageSetupDialogData* }{data = NULL}}
 
 Constructor. Pass a parent window, and optionally a pointer to a block of page setup
 data, which will be copied to the print dialog's internal data.
 
-\membersection{wxPageSetupDialog::\destruct{wxPageSetupDialog}}
+\membersection{wxPageSetupDialog::\destruct{wxPageSetupDialog}}\label{wxpagesetupdialogdtor}
 
 \func{}{\destruct{wxPageSetupDialog}}{\void}
 
@@ -50,6 +50,14 @@ Destructor.
 
 Returns the \helpref{page setup data}{wxpagesetupdialogdata} associated with the dialog.
 
+%\membersection{wxPageSetupDialog::Ok}\label{wxpagesetupdialogok}
+%
+%\constfunc{bool}{Ok}{\void}
+%
+%Returns true if the print data associated with the dialog data is valid.
+%This can return false on Windows if the current printer is not set, for example.
+%On all other platforms, it returns true.
+
 \membersection{wxPageSetupDialog::ShowModal}\label{wxpagesetupdialogshowmodal}
 
 \func{int}{ShowModal}{\void}
@@ -78,7 +86,7 @@ user-interface configuration settings stored by wxPageSetupDialogData).
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPageSetupDialogData::wxPageSetupDialogData}
+\membersection{wxPageSetupDialogData::wxPageSetupDialogData}\label{wxpagesetupdialogdatactor}
 
 \func{}{wxPageSetupDialogData}{\void}
 
@@ -88,11 +96,11 @@ Default constructor.
 
 Copy constructor.
 
-\func{}{wxPrintDialogData}{\param{wxPrintData\&}{ printData}}
+\func{}{wxPageSetupDialogData}{\param{wxPrintData\&}{ printData}}
 
-Construct an object from a print dialog data object.
+Construct an object from a print data object.
 
-\membersection{wxPageSetupDialogData::\destruct{wxPageSetupDialogData}}
+\membersection{wxPageSetupDialogData::\destruct{wxPageSetupDialogData}}\label{wxpagesetupdialogdatadtor}
 
 \func{}{\destruct{wxPageSetupDialogData}}{\void}
 
@@ -132,44 +140,44 @@ Enables or disables the {\bf Printer} button, which invokes a printer setup dial
 
 \constfunc{bool}{GetDefaultMinMargins}{\void}
 
-Returns TRUE if the page setup dialog will take its minimum margin values from the currently
+Returns true if the page setup dialog will take its minimum margin values from the currently
 selected printer properties. Windows only.
 
 \membersection{wxPageSetupDialogData::GetEnableMargins}\label{wxpagesetupdialogdatagetenablemargins}
 
 \constfunc{bool}{GetEnableMargins}{\void}
 
-Returns TRUE if the margin controls are enabled (Windows only).
+Returns true if the margin controls are enabled (Windows only).
 
 \membersection{wxPageSetupDialogData::GetEnableOrientation}\label{wxpagesetupdialogdatagetenableorientation}
 
 \constfunc{bool}{GetEnableOrientation}{\void}
 
-Returns TRUE if the orientation control is enabled (Windows only).
+Returns true if the orientation control is enabled (Windows only).
 
 \membersection{wxPageSetupDialogData::GetEnablePaper}\label{wxpagesetupdialogdatagetenablepaper}
 
 \constfunc{bool}{GetEnablePaper}{\void}
 
-Returns TRUE if the paper size control is enabled (Windows only).
+Returns true if the paper size control is enabled (Windows only).
 
 \membersection{wxPageSetupDialogData::GetEnablePrinter}\label{wxpagesetupdialogdatagetenableprinter}
 
 \constfunc{bool}{GetEnablePrinter}{\void}
 
-Returns TRUE if the printer setup button is enabled.
+Returns true if the printer setup button is enabled.
 
 \membersection{wxPageSetupDialogData::GetEnableHelp}\label{wxpagesetupdialogdatagetenablehelp}
 
 \constfunc{bool}{GetEnableHelp}{\void}
 
-Returns TRUE if the printer setup button is enabled.
+Returns true if the printer setup button is enabled.
 
 \membersection{wxPageSetupDialogData::GetDefaultInfo}\label{wxpagesetupdialogdatagetdefaultinfo}
 
 \constfunc{bool}{GetDefaultInfo}{\void}
 
-Returns TRUE if the dialog will simply return default printer information (such as orientation)
+Returns true if the dialog will simply return default printer information (such as orientation)
 instead of showing a dialog. Windows only.
 
 \membersection{wxPageSetupDialogData::GetMarginTopLeft}\label{wxpagesetupdialogdatagetmargintopleft}
@@ -218,23 +226,31 @@ Returns the paper size in millimetres.
 
 Returns a reference to the \helpref{print data}{wxprintdata} associated with this object.
 
+\membersection{wxPageSetupDialogData::Ok}\label{wxpagesetupdialogdataok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns true if the print data associated with the dialog data is valid.
+This can return false on Windows if the current printer is not set, for example.
+On all other platforms, it returns true.
+
 \membersection{wxPageSetupDialogData::SetDefaultInfo}\label{wxpagesetupdialogdatasetdefaultinfo}
 
 \func{void}{SetDefaultInfo}{\param{bool}{ flag}}
 
-Pass TRUE if the dialog will simply return default printer information (such as orientation)
+Pass true if the dialog will simply return default printer information (such as orientation)
 instead of showing a dialog. Windows only.
 
 \membersection{wxPageSetupDialogData::SetDefaultMinMargins}\label{wxpagesetupdialogdatasetdefaultminmargins}
 
 \func{void}{SetDefaultMinMargins}{\param{bool}{ flag}}
 
-Pass TRUE if the page setup dialog will take its minimum margin values from the currently
+Pass true if the page setup dialog will take its minimum margin values from the currently
 selected printer properties. Windows only. Units are in millimetres
 
 \membersection{wxPageSetupDialogData::SetMarginTopLeft}\label{wxpagesetupdialogdatasetmargintopleft}
 
-\func{void}{GetMarginTopLeft}{\param{const wxPoint\& }{pt}}
+\func{void}{SetMarginTopLeft}{\param{const wxPoint\& }{pt}}
 
 Sets the left (x) and top (y) margins in millimetres.
 
