X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f354202554d54b7c94320e06e435eb818d879c0a..afafd942a1f9d0f683a95bb72f8bc1e128543749:/docs/latex/wx/dc.tex

diff --git a/docs/latex/wx/dc.tex b/docs/latex/wx/dc.tex
index 0706ef5e70..7a2a77b2a3 100644
--- a/docs/latex/wx/dc.tex
+++ b/docs/latex/wx/dc.tex
@@ -907,8 +907,8 @@ doesn't contain anything.
                                 \param{bool}{ yBottomUp}}
 
 Sets the x and y axis orientation (i.e., the direction from lowest to
-highest values on the axis). The default orientation is the natural
-orientation, e.g. x axis from left to right and y axis from bottom up.
+highest values on the axis). The default orientation is 
+x axis from left to right and y axis from top down.
 
 \wxheading{Parameters}
 
