X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f2616db56739e4962f683f59ac9e207756efe23c..4c7852186d48a5b8f406462c2c3fa020f0a052bb:/docs/latex/wx/text.tex

diff --git a/docs/latex/wx/text.tex b/docs/latex/wx/text.tex
index 8c4fdd6ae5..724f33a98c 100644
--- a/docs/latex/wx/text.tex
+++ b/docs/latex/wx/text.tex
@@ -527,6 +527,10 @@ This function sets the maximum number of characters the user can enter into the
 control. In other words, it allows to limit the text value length to {\it len}
 not counting the terminating {\tt NUL} character.
 
+If {\it len} is $0$, the previously set max length limi, if any, is discarded
+and the user may enter as much text as the underlying native text control
+widget supports (typically at least 32Kb).
+
 If the user tries to enter more characters into the text control when it
 already is filled up to the maximal length, a 
 {\tt wxEVT\_COMMAND\_TEXT\_MAXLEN} event is sent to notify the program about it
