X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f260c476e46c2b1a5e192133707a137db010908e..fa6a837300efb9d295b889a8308b74537c9d8677:/docs/latex/wx/cmdproc.tex

diff --git a/docs/latex/wx/cmdproc.tex b/docs/latex/wx/cmdproc.tex
index 515dd43278..329b15e48c 100644
--- a/docs/latex/wx/cmdproc.tex
+++ b/docs/latex/wx/cmdproc.tex
@@ -48,7 +48,7 @@ Returns true if the currently-active command can be undone, false otherwise.
 
 \func{virtual void}{ClearCommands}{\void}
 
-Deletes all the commands in the list and sets the current command pointer to NULL.
+Deletes all commands in the list and sets the current command pointer to \NULL.
 
 
 \membersection{wxCommandProcessor::Redo}\label{wxcommandprocessorredo}
