X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f260c476e46c2b1a5e192133707a137db010908e..066f3611df971be93b2ec46b82c2f05f3ff9a422:/docs/latex/wx/cmdproc.tex?ds=sidebyside

diff --git a/docs/latex/wx/cmdproc.tex b/docs/latex/wx/cmdproc.tex
index 515dd43278..f5ae20501d 100644
--- a/docs/latex/wx/cmdproc.tex
+++ b/docs/latex/wx/cmdproc.tex
@@ -12,6 +12,10 @@ if you want different behaviour.
 
 <wx/cmdproc.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxCommandProcessor overview}{wxcommandprocessoroverview}, \helpref{wxCommand}{wxcommand}
@@ -48,7 +52,7 @@ Returns true if the currently-active command can be undone, false otherwise.
 
 \func{virtual void}{ClearCommands}{\void}
 
-Deletes all the commands in the list and sets the current command pointer to NULL.
+Deletes all commands in the list and sets the current command pointer to \NULL.
 
 
 \membersection{wxCommandProcessor::Redo}\label{wxcommandprocessorredo}
