X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f21fcc9d2e6ba3e02a686b4ed11102fdcc4c49bb..d6f2fae8e61d2a268e6f2c57d2905f219faf7c37:/docs/latex/wx/fdrepdlg.tex

diff --git a/docs/latex/wx/fdrepdlg.tex b/docs/latex/wx/fdrepdlg.tex
index 55726f8bdf..a232a70192 100644
--- a/docs/latex/wx/fdrepdlg.tex
+++ b/docs/latex/wx/fdrepdlg.tex
@@ -46,7 +46,7 @@ any pointers to it cannot be used any longer.}
 
 \func{}{wxFindDialogEvent}{\param{wxEventType }{commandType = wxEVT\_NULL}, \param{int }{id = 0}}
 
-Constuctor used by wxWindows only.
+Constuctor used by wxWidgets only.
 
 \membersection{wxFindDialogEvent::GetFlags}\label{wxfinddialogeventgetflags}
 
