X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f18eaf2687ab42c97ccf469a2617306cadc0c6ef..d3f00f59938d4801a95afa1cd638b8f15c481ee3:/docs/latex/wx/varhvscrollhelper.tex

diff --git a/docs/latex/wx/varhvscrollhelper.tex b/docs/latex/wx/varhvscrollhelper.tex
index c50f0f8bbd..2f19bd43a0 100644
--- a/docs/latex/wx/varhvscrollhelper.tex
+++ b/docs/latex/wx/varhvscrollhelper.tex
@@ -39,6 +39,10 @@ rather than from here directly.
 
 <wx/vscroll.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxHScrolledWindow}{wxhscrolledwindow},
@@ -102,15 +106,15 @@ Returns the index of the last visible column and row based on the scroll
 position. This includes any partially visible columns or rows.
 
 
-\membersection{wxVarHVScrollHelper::HitTest}\label{wxvarhvscrollhelperhittest}
+\membersection{wxVarHVScrollHelper::VirtualHitTest}\label{wxvarhvscrollhelpervirtualhittest}
 
-\constfunc{virtual wxPosition}{HitTest}{\param{wxCoord }{x}, \param{wxCoord }{y}}
+\constfunc{wxPosition}{VirtualHitTest}{\param{wxCoord }{x}, \param{wxCoord }{y}}
 
-\constfunc{virtual wxPosition}{HitTest}{\param{const wxPoint\& }{pos}}
+\constfunc{wxPosition}{VirtualHitTest}{\param{const wxPoint\& }{pos}}
 
-Returns the scroll unit under the device unit given accounting for scroll
-position or {\tt wxNOT\_FOUND} (for the row, column, or possibly both values)
-if none.
+Returns the virtual scroll unit under the device unit given accounting for
+scroll position or {\tt wxNOT\_FOUND} (for the row, column, or possibly both
+values) if none.
 
 
 \membersection{wxVarHVScrollHelper::IsVisible}\label{wxvarhvscrollhelperisvisible}
