X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f18eaf2687ab42c97ccf469a2617306cadc0c6ef..81c882b613b5d99ddb1e5ab69fcd7ebccc287025:/docs/latex/wx/vscrolledwindow.tex

diff --git a/docs/latex/wx/vscrolledwindow.tex b/docs/latex/wx/vscrolledwindow.tex
index b66c55bca5..f3ce165ad3 100644
--- a/docs/latex/wx/vscrolledwindow.tex
+++ b/docs/latex/wx/vscrolledwindow.tex
@@ -94,6 +94,11 @@ position was 0 and the first line wasn't completely visible.
 
 Deprecated for \helpref{GetRowCount()}{wxvarvscrollhelpergetrowcount}.
 
+\constfunc{int}{HitTest}{\param{wxCoord }{x}, \param{wxCoord }{y}}
+\constfunc{int}{HitTest}{\param{const wxPoint\& }{pt}}
+
+Deprecated for \helpref{VirtualHitTest()}{wxvarscrollhelperbasevirtualhittest}.
+
 \constfunc{virtual wxCoord}{OnGetLineHeight}{\param{size\_t }{line}}
 
 Deprecated for \helpref{OnGetRowHeight()}{wxvarvscrollhelperongetrowheight}.
@@ -122,6 +127,8 @@ Deprecated for \helpref{ScrollRowPages()}{wxvarvscrollhelperscrollrowpages}.
 
 Deprecated for \helpref{ScrollToRow()}{wxvarvscrollhelperscrolltorow}.
 
+\membersection{wxVScrolledWindow::SetLineCount}\label{wxvscrolledwindowsetlinecount}
+
 \func{void}{SetLineCount}{\param{size\_t }{count}}
 
 Deprecated for \helpref{SetRowCount()}{wxvarvscrollhelpersetrowcount}.
