X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f18eaf2687ab42c97ccf469a2617306cadc0c6ef..6aaee6afdcde7c9e677f642303d4988a66cb9dc9:/docs/latex/wx/varscrollhelperbase.tex

diff --git a/docs/latex/wx/varscrollhelperbase.tex b/docs/latex/wx/varscrollhelperbase.tex
index 223cd84eba..e781d4511e 100644
--- a/docs/latex/wx/varscrollhelperbase.tex
+++ b/docs/latex/wx/varscrollhelperbase.tex
@@ -27,6 +27,10 @@ from wxVarScrollHelperBase directly.
 
 <wx/vscroll.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxHScrolledWindow}{wxhscrolledwindow},
@@ -172,12 +176,13 @@ Returns the index of the last visible unit based on the scroll position. This
 includes the last unit even if it is only partially visible.
 
 
-\membersection{wxVarScrollHelperBase::HitTest}\label{wxvarscrollhelperbasehittest}
+\membersection{wxVarScrollHelperBase::VirtualHitTest}\label{wxvarscrollhelperbasevirtualhittest}
 
-\constfunc{virtual int}{HitTest}{\param{wxCoord }{coord}}
+\constfunc{int}{VirtualHitTest}{\param{wxCoord }{coord}}
 
-Returns the scroll unit under the device unit given accounting for scroll
-position or {\tt wxNOT\_FOUND} if none (i.e. if it is below the last item).
+Returns the virtual scroll unit under the device unit given accounting for
+scroll position or {\tt wxNOT\_FOUND} if none (i.e. if it is below the last
+item).
 
 
 \membersection{wxVarScrollHelperBase::IsVisible}\label{wxvarscrollhelperbaseisvisible}
