X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f18eaf2687ab42c97ccf469a2617306cadc0c6ef..0bd2681966523df88ad5cf8e505b532843e58d74:/docs/latex/wx/vscrolledwindow.tex

diff --git a/docs/latex/wx/vscrolledwindow.tex b/docs/latex/wx/vscrolledwindow.tex
index b66c55bca5..e571ab1131 100644
--- a/docs/latex/wx/vscrolledwindow.tex
+++ b/docs/latex/wx/vscrolledwindow.tex
@@ -49,6 +49,10 @@ well as logical coordinates.
 
 <wx/vscroll.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxHScrolledWindow}{wxhscrolledwindow},
@@ -94,6 +98,11 @@ position was 0 and the first line wasn't completely visible.
 
 Deprecated for \helpref{GetRowCount()}{wxvarvscrollhelpergetrowcount}.
 
+\constfunc{int}{HitTest}{\param{wxCoord }{x}, \param{wxCoord }{y}}
+\constfunc{int}{HitTest}{\param{const wxPoint\& }{pt}}
+
+Deprecated for \helpref{VirtualHitTest()}{wxvarscrollhelperbasevirtualhittest}.
+
 \constfunc{virtual wxCoord}{OnGetLineHeight}{\param{size\_t }{line}}
 
 Deprecated for \helpref{OnGetRowHeight()}{wxvarvscrollhelperongetrowheight}.
