X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f10ccf9e6b4e67e08a3d13cd06cb13f28be15f4f..17ede0b11d44bf02e09dce4f3e0e32d594458b0f:/docs/latex/wx/function.tex

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index 47d46b1b40..2b06d32202 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -3286,6 +3286,10 @@ Open the \arg{url} in user's default browser. If \arg{flags} parameter contains
 
 Returns \true if the application was successfully launched.
 
+Note that for some configurations of the running user, the application which
+is launched to open the given URL may be URL-dependent (e.g. a browser may be used for
+local URLs while another one may be used for remote URLs).
+
 \wxheading{Include files}
 
 <wx/utils.h>
