X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f0e8a2d07799ba3a8d03487dfc181d7f5a38a2ad..df1b5a2a9f5b7c88eff552bbe926ea2e26dc063d:/docs/latex/wx/inputstr.tex

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index 54897253f8..7f48f40df4 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -30,6 +30,13 @@ Creates a dummy input stream.
 
 Destructor.
 
+\membersection{wxInputStream::CanRead}\label{wxinputstreamcanread}
+
+\constfunc{bool}{CanRead}{\void}
+
+Returns true if some data is available in the stream right now, so that
+calling \helpref{Read()}{wxinputstreamread} wouldn't block.
+
 \membersection{wxInputStream::GetC}\label{wxinputstreamgetc}
 
 \func{char}{GetC}{\void}
@@ -43,7 +50,7 @@ If EOF, return value is undefined and LastRead() will return 0 and not 1.
 
 \membersection{wxInputStream::Eof}\label{wxinputstreameof}
 
-\constfunc{wxInputStream}{Eof}{\void}
+\constfunc{bool}{Eof}{\void}
 
 Returns true if the end of stream has been reached.
 
