X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f0e8a2d07799ba3a8d03487dfc181d7f5a38a2ad..6d3c4b2aee2a64ba3245f2cec9751e4608a9bc3c:/docs/latex/wx/mdi.tex?ds=sidebyside

diff --git a/docs/latex/wx/mdi.tex b/docs/latex/wx/mdi.tex
index 668d732b8b..f4ed04e303 100644
--- a/docs/latex/wx/mdi.tex
+++ b/docs/latex/wx/mdi.tex
@@ -125,7 +125,7 @@ for further details.
 
 \membersection{wxMDIChildFrame::Maximize}\label{wxmdichildframemaximize}
 
-\func{void}{Maximize}{\void}
+\func{void}{Maximize}{\param{bool}{maximize}}
 
 Maximizes this MDI child frame.
 
@@ -545,9 +545,12 @@ To remove the window completely, use the wxFRAME\_NO\_WINDOW\_MENU window style.
 
 \membersection{wxMDIParentFrame::Tile}\label{wxmdiparentframetile}
 
-\func{void}{Tile}{\void}
+\func{void}{Tile}{\param{wxOrientation}{ orient = wxHORIZONTAL}}
 
-Tiles the MDI child windows.
+Tiles the MDI child windows either horizontally or vertically depending on
+whether \arg{orient} is wxHORIZONTAL or wxVERTICAL.
+
+Currently only implemented for MSW, does nothing under the other platforms.
 
 \wxheading{See also}
 
