X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f0e8a2d07799ba3a8d03487dfc181d7f5a38a2ad..5e6ce06a0d6c2a21ede24343fb9541f4101af582:/docs/latex/wx/mdi.tex?ds=inline

diff --git a/docs/latex/wx/mdi.tex b/docs/latex/wx/mdi.tex
index 668d732b8b..02586b0736 100644
--- a/docs/latex/wx/mdi.tex
+++ b/docs/latex/wx/mdi.tex
@@ -6,6 +6,7 @@ which is itself a child of \helpref{wxMDIParentFrame}{wxmdiparentframe}.
 \wxheading{Derived from}
 
 \helpref{wxFrame}{wxframe}\\
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
@@ -14,6 +15,10 @@ which is itself a child of \helpref{wxMDIParentFrame}{wxmdiparentframe}.
 
 <wx/mdi.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -125,7 +130,7 @@ for further details.
 
 \membersection{wxMDIChildFrame::Maximize}\label{wxmdichildframemaximize}
 
-\func{void}{Maximize}{\void}
+\func{void}{Maximize}{\param{bool}{maximize}}
 
 Maximizes this MDI child frame.
 
@@ -160,6 +165,10 @@ more \helpref{wxMDIChildFrame}{wxmdichildframe} objects.
 
 <wx/mdi.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Remarks}
 
 The client window is the area where MDI child windows exist. It doesn't have to cover the whole
@@ -228,6 +237,7 @@ and is used in many popular Windows applications, such as Microsoft Word(TM).
 \wxheading{Derived from}
 
 \helpref{wxFrame}{wxframe}\\
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
@@ -236,6 +246,10 @@ and is used in many popular Windows applications, such as Microsoft Word(TM).
 
 <wx/mdi.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Remarks}
 
 There may be multiple MDI parent frames in a single application, but this probably only makes sense
@@ -245,7 +259,7 @@ Child frames may be of class \helpref{wxMDIChildFrame}{wxmdichildframe} (contain
 within the parent frame) or \helpref{wxFrame}{wxframe} (shown as a top-level frame).
 
 An MDI parent frame always has a \helpref{wxMDIClientWindow}{wxmdiclientwindow} associated with it, which
-is the parent for MDI client frames.
+is the parent for MDI child frames.
 This client window may be resized to accommodate non-MDI windows, as seen in Microsoft Visual C++ (TM) and
 Microsoft Publisher (TM), where a documentation window is placed to one side of the workspace.
 
@@ -545,9 +559,12 @@ To remove the window completely, use the wxFRAME\_NO\_WINDOW\_MENU window style.
 
 \membersection{wxMDIParentFrame::Tile}\label{wxmdiparentframetile}
 
-\func{void}{Tile}{\void}
+\func{void}{Tile}{\param{wxOrientation}{ orient = wxHORIZONTAL}}
+
+Tiles the MDI child windows either horizontally or vertically depending on
+whether \arg{orient} is wxHORIZONTAL or wxVERTICAL.
 
-Tiles the MDI child windows.
+Currently only implemented for MSW, does nothing under the other platforms.
 
 \wxheading{See also}
 
