X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f0e8a2d07799ba3a8d03487dfc181d7f5a38a2ad..42d9ad7949254ed53f89ad6306dcb2a266bfffb3:/docs/latex/wx/ilayout.tex?ds=inline

diff --git a/docs/latex/wx/ilayout.tex b/docs/latex/wx/ilayout.tex
index f061cf0bc5..6790574167 100644
--- a/docs/latex/wx/ilayout.tex
+++ b/docs/latex/wx/ilayout.tex
@@ -14,6 +14,10 @@ which means that their values should be calculated by looking at known constrain
 
 <wx/layout.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{Overview and examples}{constraintsoverview},\rtfsp
