X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f010ad481266d9267f5f4fd0547a9fc891441715..a607d8d633e055fc5cea22c0b829cd65b5c3dbfb:/docs/latex/wx/ddeservr.tex

diff --git a/docs/latex/wx/ddeservr.tex b/docs/latex/wx/ddeservr.tex
index 73aefdf50a..d5d2bd2612 100644
--- a/docs/latex/wx/ddeservr.tex
+++ b/docs/latex/wx/ddeservr.tex
@@ -15,25 +15,29 @@ wxServerBase
 
 <wx/dde.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxDDEClient}{wxddeclient}, \helpref{wxDDEConnection}{wxddeconnection}, \helpref{IPC overview}{ipcoverview}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxDDEServer::wxDDEServer}
+\membersection{wxDDEServer::wxDDEServer}\label{wxddeserverctor}
 
 \func{}{wxDDEServer}{\void}
 
 Constructs a server object.
 
-\membersection{wxDDEServer::Create}
+\membersection{wxDDEServer::Create}\label{wxddeservercreate}
 
 \func{bool}{Create}{\param{const wxString\& }{service}}
 
 Registers the server using the given service name. Under UNIX, the
 string must contain an integer id which is used as an Internet port
-number. FALSE is returned if the call failed (for example, the port
+number. false is returned if the call failed (for example, the port
 number is already in use).
 
 \membersection{wxDDEServer::OnAcceptConnection}\label{wxddeserveronacceptconnection}
