X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/f010ad481266d9267f5f4fd0547a9fc891441715..544229d1069a20ca4c81fac6059aa4d92d8559ef:/docs/latex/wx/tipc.tex

diff --git a/docs/latex/wx/tipc.tex b/docs/latex/wx/tipc.tex
index 4360c0d7ea..0a8c8b255c 100644
--- a/docs/latex/wx/tipc.tex
+++ b/docs/latex/wx/tipc.tex
@@ -6,7 +6,7 @@ Classes: \helpref{wxServer}{wxddeserver},
 %\helpref{wxTCPServer}{wxtcpserver}, \helpref{wxTCPConnection}{wxtcpconnection},
 %\helpref{wxTCPClient}{wxtcpclient}
 
-wxWindows has a number of different classes to help with
+wxWidgets has a number of different classes to help with
 interprocess communication and network programming. This section
 only discusses one family of classes -- the DDE-like protocol --
 but here's a list of other useful classes:
@@ -20,7 +20,7 @@ but here's a list of other useful classes:
 for programming popular Internet protocols.
 \end{itemize}
 
-wxWindows' DDE-like protocol is a high-level protocol based on
+wxWidgets' DDE-like protocol is a high-level protocol based on
 Windows DDE. There are two implementations of this DDE-like
 protocol: one using real DDE running on Windows only, and another
 using TCP/IP (sockets) that runs on most platforms. Since the API
@@ -34,8 +34,8 @@ convenient synonyms for the IPC classes: {\tt wxServer} for either
 DDE-based or socket-based implementation is used and the same
 thing for {\tt wxClient} and {\tt wxConnection}.
 
-By default, DDE implementation is used under Windows. DDE works
-only within one computer. If you want to use IPC between
+By default, the DDE implementation is used under Windows. DDE works
+within one computer only. If you want to use IPC between
 different workstations you should define {\tt
 wxUSE\_DDE\_FOR\_IPC} as $0$ before including this header -- this
 will force using TCP/IP implementation even under Windows.
@@ -70,7 +70,7 @@ used for the communications or a valid file name (which shouldn't
 exist and will be deleted afterwards) in which case a Unix domain
 socket is created.
 
-{\bf SECURITY NOTE:} Using Internet domain sockets if extremely insecure for
+{\bf SECURITY NOTE:} Using Internet domain sockets is extremely insecure for
 IPC as there is absolutely no access control for them, use Unix domain sockets
 whenever possible!
 
@@ -118,7 +118,7 @@ successful.
 \item Use the wxConnection member functions to send messages to the server.
 \end{enumerate}
 
-\subsection{Data transfer}
+\subsection{Data transfer}\label{datatransfer}
 
 These are the ways that data can be transferred from one
 application to another. These are methods of wxConnection.
@@ -145,7 +145,7 @@ The default data type is wxCF\_TEXT (ASCII text), and the default data
 size is the length of the null-terminated string. Windows-specific data
 types could also be used on the PC.
 
-\subsection{Examples}
+\subsection{Examples}\label{ipcexamples}
 
 See the sample programs {\it server}\/ and {\it client}\/ in the IPC
 samples directory.  Run the server, then the client. This demonstrates
@@ -153,7 +153,7 @@ using the Execute, Request, and Poke commands from the client, together
 with an Advise loop: selecting an item in the server list box causes
 that item to be highlighted in the client list box.
 
-\subsection{More DDE details}
+\subsection{More DDE details}\label{ddedetails}
 
 A wxClient object initiates the client part of a client-server
 DDE-like (Dynamic Data Exchange) conversation (available in both
@@ -220,5 +220,5 @@ where the server calls the client when data has changed).
 \end{verbatim}
 
 Note that it is no longer necessary to call wxDDEInitialize or wxDDECleanUp, since
-wxWindows will do this itself if necessary.
+wxWidgets will do this by itself if necessary.
 
