X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ef8d96c29c73b9da8cdaa2b8b4737862c85ccc20..c0bcc480680ecdf368839c119f5e984df757f893:/docs/latex/wx/thread.tex

diff --git a/docs/latex/wx/thread.tex b/docs/latex/wx/thread.tex
index f7c4a1997e..001281e5fd 100644
--- a/docs/latex/wx/thread.tex
+++ b/docs/latex/wx/thread.tex
@@ -309,3 +309,4 @@ Waits until the thread terminates and returns its exit code or {\tt
 You can only Wait() for joinable (not detached) threads.
 
 This function can only be called from another thread context.
+
