X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ef316e23c9a67ab20180f3a07bd78476a6caa69a..7e57f04a1731a9c2cb199a5c0d8ab7fab1afdc65:/docs/latex/wx/grid.tex

diff --git a/docs/latex/wx/grid.tex b/docs/latex/wx/grid.tex
index 0231c365d0..2b0375eba6 100644
--- a/docs/latex/wx/grid.tex
+++ b/docs/latex/wx/grid.tex
@@ -183,11 +183,11 @@ The memory requirements for this could become prohibitive if your grid is very l
 
 
 
-\membersection{wxGrid::AutoSizeColOrRow}\label{wxgridautosizecolorrow}
+\membersection{wxGrid::AutoSizeColLabelSize}\label{wxgridautosizecollabelsize}
 
-\func{void}{AutoSizeColOrRow}{\param{int }{n}, \param{bool }{setAsMin}, \param{bool }{column}}
+\func{void}{AutoSizeColLabelSize}{\param{int }{col}}
 
-Common part of AutoSizeColumn/Row() or row?
+Automatically adjusts width of the column to fit its label.
 
 
 
@@ -230,6 +230,14 @@ The memory requirements for this could become prohibitive if your grid is very l
 
 
 
+\membersection{wxGrid::AutoSizeRowLabelSize}\label{wxgridautosizerowlabelsize}
+
+\func{void}{AutoSizeRowLabelSize}{\param{int }{col}}
+
+Automatically adjusts height of the row to fit its label.
+
+
+
 \membersection{wxGrid::AutoSizeRows}\label{wxgridautosizerows}
 
 \func{void}{AutoSizeRows}{\param{bool }{setAsMin = true}}
@@ -253,6 +261,10 @@ the grid is suppressed. Each call to BeginBatch must be matched by a later call
 modification can be enclosed between BeginBatch and EndBatch calls to avoid
 screen flicker. The final EndBatch will cause the grid to be repainted.
 
+\wxheading{See also}
+
+\helpref{wxGridUpdateLocker}{wxgridupdatelocker}
+
 
 
 \membersection{wxGrid::BlockToDeviceRect}\label{wxgridblocktodevicerect}
@@ -514,6 +526,10 @@ EndBatch. Code that does a lot of grid modification can be enclosed between
 BeginBatch and EndBatch calls to avoid screen flicker. The final EndBatch will
 cause the grid to be repainted.
 
+\wxheading{See also}
+
+\helpref{wxGridUpdateLocker}{wxgridupdatelocker}
+
 
 
 \membersection{wxGrid::Fit}\label{wxgridfit}
@@ -1604,6 +1620,9 @@ Vertical alignment should be one of wxALIGN\_TOP, wxALIGN\_CENTRE or wxALIGN\_BO
 
 Sets the height of the column labels.
 
+If \arg{height} equals to \texttt{wxGRID\_AUTOSIZE} then height is calculated automatically
+so that no label is truncated. Note that this could be slow for a large table.
+
 
 
 \membersection{wxGrid::SetColLabelValue}\label{wxgridsetcollabelvalue}
@@ -1843,6 +1862,9 @@ Vertical alignment should be one of wxALIGN\_TOP, wxALIGN\_CENTRE or wxALIGN\_BO
 
 Sets the width of the row labels.
 
+If \arg{width} equals \texttt{wxGRID\_AUTOSIZE} then width is calculated automatically
+so that no label is truncated. Note that this could be slow for a large table.
+
 
 
 \membersection{wxGrid::SetRowLabelValue}\label{wxgridsetrowlabelvalue}
