X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ed93168bf9d23bdc83184039c84d263ed6f87945..ce9a75d225a393cd09681aeda19bec908e4c622d:/docs/latex/wx/wxstring.tex

diff --git a/docs/latex/wx/wxstring.tex b/docs/latex/wx/wxstring.tex
index bd681259d6..5aa5d9d4a5 100644
--- a/docs/latex/wx/wxstring.tex
+++ b/docs/latex/wx/wxstring.tex
@@ -16,6 +16,12 @@ None
 
 <wx/string.h>
 
+\wxheading{Predefined objects}
+
+Objects:
+
+{\bf wxEmptyString}
+
 \wxheading{See also}
 
 \overview{Overview}{wxstringoverview}
@@ -636,7 +642,18 @@ caseSensitive is TRUE by default (case matters).
 
 Returns TRUE if strings are equal, FALSE otherwise.
 
-See also \helpref{Cmp}{wxstringcmp}, \helpref{CmpNoCase}{wxstringcmpnocase}.
+See also \helpref{Cmp}{wxstringcmp}, \helpref{CmpNoCase}{wxstringcmpnocase}, \helpref{IsSameAs}{wxstringissameas2}
+
+\membersection{wxString::IsSameAs}\label{wxstringissameas2}
+
+\constfunc{bool}{IsSameAs}{\param{char}{ c}, \param{bool}{ caseSensitive = TRUE}}
+
+Test whether the string is equal to the single character {\it c}. The test is
+case-sensitive if {\it caseSensitive} is TRUE (default) or not if it is FALSE.
+
+Returns TRUE if the string is equal to the character, FALSE otherwise.
+
+See also \helpref{Cmp}{wxstringcmp}, \helpref{CmpNoCase}{wxstringcmpnocase}, \helpref{IsSameAs}{wxstringissameas}
 
 \membersection{wxString::IsWord}\label{wxstringisword}
 
@@ -779,11 +796,6 @@ Returns the number of replacements made.
 
 Returns the last {\it count} characters.
 
-\constfunc{wxString}{Right}{\param{char}{ ch}}
-
-Returns all characters after the last occurence of {\it ch}.
-Returns the whole string if {\it ch} is not found.
-
 \membersection{wxString::SetChar}\label{wxstringsetchar}
 
 \func{void}{SetChar}{\param{size\_t}{ n}, \param{char}{ch}}
