X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ed93168bf9d23bdc83184039c84d263ed6f87945..1193d8fa93f2ef491786b96adc9c55cae6b2d7b1:/docs/latex/wx/tlog.tex

diff --git a/docs/latex/wx/tlog.tex b/docs/latex/wx/tlog.tex
index 8c031a488f..de86933c68 100644
--- a/docs/latex/wx/tlog.tex
+++ b/docs/latex/wx/tlog.tex
@@ -1,4 +1,4 @@
-\section{Log classes overview}\label{wxlogoverview}
+\section{wxLog classes overview}\label{wxlogoverview}
 
 Classes: \helpref{wxLog}{wxlog}, wxLogStderr,
 wxLogOstream, wxLogTextCtrl, wxLogWindow, wxLogGui, wxLogNull
@@ -44,6 +44,9 @@ first argument.
 \item{\bf wxLogDebug} is {\bf the} right function for debug output. It only
 does anything at all in the debug mode (when the preprocessor symbol
 \_\_WXDEBUG\_\_ is defined) and expands to nothing in release mode (otherwise).
+{\bf Tip:} under Windows, you must either run the program under debugger or
+use a 3rd party program such as \urlref{DbgView}{http://www.sysinternals.com} 
+to actually see the debug output.
 \item{\bf wxLogTrace} as {\bf wxLogDebug} only does something in debug
 build. The reason for making it a separate function from it is that usually
 there are a lot of trace messages, so it might make sense to separate them
