X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ed446867f5e1ab8f3978533b525d0aeed344c32f..4179da8a81ee3110e2a8b5615e1a4f8c8b75a16b:/docs/latex/wx/thread.tex?ds=sidebyside

diff --git a/docs/latex/wx/thread.tex b/docs/latex/wx/thread.tex
index fa40d4e833..4cf259e208 100644
--- a/docs/latex/wx/thread.tex
+++ b/docs/latex/wx/thread.tex
@@ -4,7 +4,7 @@ A thread is basically a path of execution through a program. Threads are
 sometimes called {\it light-weight processes}, but the fundamental difference
 between threads and processes is that memory spaces of different processes are
 separated while all threads share the same address space. While it makes it
-much easier to share common data between several threads, it also makes much
+much easier to share common data between several threads, it also makes it much
 easier to shoot oneself in the foot, so careful use of synchronization objects
 such as \helpref{mutexes}{wxmutex} and/or \helpref{critical sections}{wxcriticalsection} is recommended.
 
@@ -62,7 +62,7 @@ The possible values for {\it kind} parameters are:
 \end{twocollist}
 
 
-\membersection{wxThread::\destruct{wxThread}}
+\membersection{wxThread::\destruct{wxThread}}\label{wxthreaddtor}
 
 \func{}{\destruct{wxThread}}{\void}
 
@@ -203,7 +203,7 @@ The following priorities are defined:
 
 Returns \true if the thread is alive (i.e. started and not terminating).
 
-Note that this function can only be saely used with joinable threads, not
+Note that this function can only be safely used with joinable threads, not
 detached ones as the latter delete themselves and so when the real thread is
 not alive any longer it is not possible to call this function neither because
 the wxThread object doesn't exist any more as well.
