X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ed446867f5e1ab8f3978533b525d0aeed344c32f..27bb69ac80420cf4681182ac9b75260048b77f90:/docs/latex/wx/thread.tex

diff --git a/docs/latex/wx/thread.tex b/docs/latex/wx/thread.tex
index fa40d4e833..1559443b69 100644
--- a/docs/latex/wx/thread.tex
+++ b/docs/latex/wx/thread.tex
@@ -4,7 +4,7 @@ A thread is basically a path of execution through a program. Threads are
 sometimes called {\it light-weight processes}, but the fundamental difference
 between threads and processes is that memory spaces of different processes are
 separated while all threads share the same address space. While it makes it
-much easier to share common data between several threads, it also makes much
+much easier to share common data between several threads, it also makes it much
 easier to shoot oneself in the foot, so careful use of synchronization objects
 such as \helpref{mutexes}{wxmutex} and/or \helpref{critical sections}{wxcriticalsection} is recommended.
 
@@ -62,7 +62,7 @@ The possible values for {\it kind} parameters are:
 \end{twocollist}
 
 
-\membersection{wxThread::\destruct{wxThread}}
+\membersection{wxThread::\destruct{wxThread}}\label{wxthreaddtor}
 
 \func{}{\destruct{wxThread}}{\void}
 
@@ -203,11 +203,10 @@ The following priorities are defined:
 
 Returns \true if the thread is alive (i.e. started and not terminating).
 
-Note that this function can only be saely used with joinable threads, not
+Note that this function can only safely be used with joinable threads, not
 detached ones as the latter delete themselves and so when the real thread is
-not alive any longer it is not possible to call this function neither because
-the wxThread object doesn't exist any more as well.
-
+no longer alive, it is not possible to call this function because
+the wxThread object no longer exists.
 
 \membersection{wxThread::IsDetached}\label{wxthreadisdetached}
 
