X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ece835440d36b38df071842e1b8dedf7143d86c3..2cfbeac8141db28d9a022cdf92c12f82631a3c82:/docs/latex/wx/process.tex?ds=inline

diff --git a/docs/latex/wx/process.tex b/docs/latex/wx/process.tex
index d4dbeec3da..d19b33a4b0 100644
--- a/docs/latex/wx/process.tex
+++ b/docs/latex/wx/process.tex
@@ -155,7 +155,7 @@ Returns {\tt true} if the child process standard output stream is opened.
 
 \membersection{wxProcess::Kill}\label{wxprocesskill}
 
-\func{static wxKillError}{Kill}{\param{int}{ pid}, \param{wxSignal}{ signal = wxSIGNONE}}
+\func{static wxKillError}{Kill}{\param{int}{ pid}, \param{wxSignal}{ signal = wxSIGNONE}, \param{int }{flags = wxKILL\_NOCHILDREN}}
 
 Send the specified signal to the given process. Possible signal values are:
 
@@ -185,6 +185,11 @@ enum wxSignal
 under both Unix and Windows but all the other signals are equivalent to
 {\tt wxSIGTERM} under Windows.
 
+The {\it flags} parameter can be wxKILL\_NOCHILDREN (the default),
+or wxKILL\_CHILDREN, in which case the child processes of this
+process will be killed too. Note that under Unix, for wxKILL\_CHILDREN
+to work you should have created the process passing wxEXEC\_MAKE_GROUP\_LEADER.
+
 Returns the element of {\tt wxKillError} enum:
 
 \begin{verbatim}
