X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ec78053243b4d5ee07b14f8bcc71b03c27b118d5..80d2803f703d1b238f42725504f08266ef02defe:/docs/latex/wx/ipvaddr.tex

diff --git a/docs/latex/wx/ipvaddr.tex b/docs/latex/wx/ipvaddr.tex
index b982f7429f..1e2fddfdb5 100644
--- a/docs/latex/wx/ipvaddr.tex
+++ b/docs/latex/wx/ipvaddr.tex
@@ -14,7 +14,6 @@
 % ----------------------------------------------------------------------------
 % MEMBERS
 % ----------------------------------------------------------------------------
-
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 %
@@ -101,7 +100,6 @@ to {\bf INADDR\_ANY}.
 
 Returns TRUE on success, FALSE if something went wrong.
 
-
 %
 % LocalHost
 %
@@ -110,7 +108,7 @@ Returns TRUE on success, FALSE if something went wrong.
 
 \func{bool}{LocalHost}{\void}
 
-Set address to "localhost" (127.0.0.1). Whenever possible, use the
+Set address to localhost (127.0.0.1). Whenever possible, use the 
 \helpref{wxIPV4address::AnyAddress}{wxipv4addressanyaddress},
 function instead of this one, as this will correctly handle multi-homed
 hosts and avoid other small problems.
