X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ec5f0c24123fe801fb82b69771c171c0b9d064fc..763b330106e9d3c9c198fc1b1cac4e1ca06c222f:/docs/latex/wx/dialog.tex

diff --git a/docs/latex/wx/dialog.tex b/docs/latex/wx/dialog.tex
index 2fb1789b78..7d3b71676d 100644
--- a/docs/latex/wx/dialog.tex
+++ b/docs/latex/wx/dialog.tex
@@ -70,7 +70,7 @@ the dialog to respond to system close events.
 \twocolitem{\windowstyle{wxMAXIMIZE\_BOX}}{Displays a maximize box on the dialog.}
 \twocolitem{\windowstyle{wxMINIMIZE\_BOX}}{Displays a minimize box on the dialog.}
 \twocolitem{\windowstyle{wxTHICK\_FRAME}}{Display a thick frame around the window.}
-\twocolitem{\windowstyle{wxSTAY\_ON\_TOP}}{The dialog stays on top of all other windows (Windows only).}
+\twocolitem{\windowstyle{wxSTAY\_ON\_TOP}}{The dialog stays on top of all other windows.}
 \twocolitem{\windowstyle{wxNO\_3D}}{Under Windows, specifies that the child controls
 should not have 3D borders unless specified in the control.}
 \twocolitem{\windowstyle{wxDIALOG\_NO\_PARENT}}{By default, a dialog created
