X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ec59d2ccea39b0225f49e6dd326d4d11940d656d..924b84ab9461c95cf5c5386d1091ae0f7a8e7ce7:/docs/latex/wx/htwindow.tex?ds=sidebyside

diff --git a/docs/latex/wx/htwindow.tex b/docs/latex/wx/htwindow.tex
index d38a1e0d8d..52bf97972f 100644
--- a/docs/latex/wx/htwindow.tex
+++ b/docs/latex/wx/htwindow.tex
@@ -51,7 +51,7 @@ text.}
 
 Default constructor.
 
-\func{}{wxHtmlWindow}{\param{wxWindow }{*parent}, \param{wxWindowID }{id = -1}, \param{const wxPoint\& }{pos = wxDefaultPosition}, \param{const wxSize\& }{size = wxDefaultSize}, \param{long }{style = wxHW\_SCROLLBAR\_AUTO}, \param{const wxString\& }{name = "htmlWindow"}}
+\func{}{wxHtmlWindow}{\param{wxWindow }{*parent}, \param{wxWindowID }{id = -1}, \param{const wxPoint\& }{pos = wxDefaultPosition}, \param{const wxSize\& }{size = wxDefaultSize}, \param{long }{style = wxHW\_DEFAULT\_STYLE}, \param{const wxString\& }{name = "htmlWindow"}}
 
 Constructor. The parameters are the same as for the \helpref{wxScrolledWindow}{wxscrolledwindow} constructor.
 
@@ -305,6 +305,13 @@ Selects all text in the window.
 \helpref{SelectLine}{wxhtmlwindowselectline},
 \helpref{SelectWord}{wxhtmlwindowselectword}
 
+\membersection{wxHtmlWindow::SelectionToText}\label{wxhtmlwindowselectiontotext}
+
+\func{wxString}{SelectionToText}{\void}
+
+Returns current selection as plain text. Returns empty string if no text
+is currently selected.
+
 \membersection{wxHtmlWindow::SelectLine}\label{wxhtmlwindowselectline}
 
 \func{void}{SelectLine}{\param{const wxPoint\& }{pos}}
@@ -413,6 +420,11 @@ this sets statusbar slot where messages will be displayed.
 
 \docparam{bar}{statusbar slot number (0..n)}
 
+\membersection{wxHtmlWindow::ToText}\label{wxhtmlwindowtotext}
+
+\func{wxString}{ToText}{\void}
+
+Returns content of currently displayed page as plain text.
 
 \membersection{wxHtmlWindow::WriteCustomization}\label{wxhtmlwindowwritecustomization}
 
