X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/eb5fa34b65af685da8e9c8b383a7f7f0f3f15a2a..ab9d0a8ca3d306898d92960ecfaefb8c1191b18a:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index d396eac714..974007cf09 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -58,7 +58,7 @@ use:
   wxSystemOptions::SetOption(wxT("msw.remap"), 2);
 \end{verbatim}
 
-then colour remapping is switched of, and a transparent background used. But only
+then colour remapping is switched off, and a transparent background used. But only
 use this option under Windows XP with true colour:
 
 \begin{verbatim}
@@ -473,7 +473,7 @@ Returns the value used for packing tools.
 
 \constfunc{int}{GetToolPos}{\param{int }{toolId}}
 
-Returns the tool position in the toolbar, or wxNOT\_FOUND if the tool is not found.
+Returns the tool position in the toolbar, or {\tt wxNOT\_FOUND} if the tool is not found.
 
 \membersection{wxToolBar::GetToolSeparation}\label{wxtoolbargettoolseparation}
 
